
type = int , min = 0, max = 5
[GroupeSpheres]
rayons = float[]
centresX = float[]
centresY = float[]
centresZ = float[]
type = string[]
[/GroupeSpheres]
coeff_frottement_visqueux = float, min = 0.0, def = 0.0